<template>
    <div class='jf-inner' style='width:100%;overflow:hidden'>
        <rotation size='width' :rotationImg='tableImg' :type='3'></rotation>
    </div>
</template>
<script>
// import Select from '@/components/Select/Select.vue'
import { Select } from 'meri-design'

export default {
    props: ['tableImg', 'loading'],
    data() {
        return {}
    },
    components: { Select },
    methods: {}
}
</script>
<style lang="less" scoped>
.jf-inner {
    width: 100%;
    height: 700px;
    overflow: hidden;
    margin: 0 auto;
    margin-top: 8px;
}
</style>
<style lang="less">
.compute-item {
    .compute-center {
        display: flex;
        align-items: center;
        margin-bottom: 12px;
    }
    .foot {
        height: 32px;
        display: flex;
        justify-content: flex-end;
        margin-top: 28px;
    }
}
</style>